\subsection{Preflight checklist}

Before actual certification is commenced we perform a manual test using a checklist.
If any of the checks fail we immediately reject the product.

\begin{enumerate}
	\item Is the product complete?
	\item Does the product come with a manual or quick start guide?
	\item Is it possible to get the product in a usable state?
	\item Can we use the product to initiate a connection in a corruption
	free
	environment?
\end{enumerate}

\textbf{DIT MOET VERANDERD WORDEN, HET PRODUCT ZOU AFGEKEURD WORDEN!}

\subsection{Manual testing of SUT}

The following requests are taken into considering while constructing test cases.

\begin{enumerate}
	\item Single valid request.
	\item Single invalid request with.
	\begin{enumerate}
		\item Corrupted checksum.
		\item Corrupted payload with.
		\begin{enumerate}
			\item Oven number of bits flipped.
			\item Odd number of bits flipped.
		\end{enumerate}
		\item Corrupted source address.
		\item Corrupted destination address.
	\end{enumerate}
	\item Multiple valid requests received in order.
	\item Multiple valid requests received out of order.
	\item Mixed valid and invalid requests with.
	\begin{enumerate}
		\item Missing packets.
		\item Corrupted checksum.
		\item Corrupted payload with.
		\begin{enumerate}
			\item Oven number of bits flipped.
			\item Odd number of bits flipped.
		\end{enumerate}
		\item Corrupted source address.
		\item Corrupted destination address.
	\end{enumerate}
\end{enumerate}

Above enumeration results in a total of $14$ test cases.
