% the test architecture.

% Develop a test environment or test architecture which will be used 
% for model-based testing of your SUT. Give a sketch of the test 
% architecture, i.e., the positioning of the SUT, test tool(s), 
% adapter(s), logging tool(s), ..., and their connections and 
% interfaces; explain your choices. Try to reuse (parts of) the 
% test-execution automation environment that you developed during the 
% second assignment.
